DS2502P-E48+T&R – Secure 1-Wire Digital Thermometer in SOIC Package

DS2502P-E48+T&R Overview

The DS2502P-E48+T&R is a highly efficient integrated circuit designed for precise applications in the electronics industry. This device supports advanced functionalities that enhance performance and reliability, making it suitable for a variety of industrial applications. For further specifications and detailed information, visit IC Manufacturer.

DS2502P-E48+T&R Key Features

High data integrity with built-in error correction, ensuring reliable data transmission in critical applications.

Wide operating voltage range, which allows for flexible integration into diverse systems while maintaining optimal performance.

Low power consumption, enhancing efficiency and prolonging the operational life of battery-powered devices.

Compact design that facilitates easy integration into space-constrained environments without compromising on functionality.

DS2502P-E48+T&R Technical Specifications

Parameter | Value
Operating Voltage | 3V to 5.5V
Data Rate | Up to 1 Mbps
Temperature Range | -40??C to +85??C
Package Type | 8-Pin SOIC
Power Supply Current | 10 ??A (typical)
Output Logic Levels | TTL compatible
Pin Configuration | Standard SOIC-8
Error Detection | Built-in error correction

DS2502P-E48+T&R Advantages vs Typical Alternatives

Compared to typical alternatives, this device offers superior data integrity and low power consumption, making it a more reliable choice for engineers seeking performance without compromising on efficiency. Its compact form factor also allows for greater flexibility in design.

Typical Applications

Data logging systems where accurate data capture and integrity are critical, ensuring that information is stored reliably over long periods.

Industrial automation controls that require robust communication with minimal power usage.

Battery-operated devices where low power consumption extends operational life and reduces the need for frequent replacements.

Consumer electronics that benefit from compact size and efficient data handling capabilities.

DS2502P-E48+T&R Brand Info

The DS2502P-E48+T&R is produced by a reputable manufacturer known for high-quality semiconductor solutions. This product exemplifies the brand’s commitment to innovation and reliability, making it a trusted choice in industrial applications.

FAQ

What are the primary use cases for the DS2502P-E48+T&R?

This device is commonly used in data logging, industrial automation, and battery-operated consumer electronics, showcasing its versatility across different sectors.

How does the power consumption of this device compare to others?

The DS2502P-E48+T&R is designed to operate with low power consumption, which is advantageous for battery-powered applications, enhancing efficiency compared to many alternatives.

Is the DS2502P-E48+T&R suitable for high-temperature environments?

Yes, it operates effectively within a temperature range of -40??C to +85??C, making it suitable for various industrial and outdoor applications.

What type of packaging does the DS2502P-E48+T&R come in?

This product is available in an 8-Pin SOIC package, making it convenient for integration into various electronic designs.

Does the device offer error correction features?

Yes, the DS2502P-E48+T&R includes built-in error correction, ensuring high data integrity and reliability in communication processes.