DS28E07P+T Digital Temperature Sensor – 8-Pin TDFN Package

DS28E07P+T Overview

The DS28E07P+T is a highly integrated, low-power secure memory device designed for applications requiring strong security features. This 1-Wire? interface chip is ideal for use in various environments where data integrity and authentication are critical. With its advanced features, this device ensures efficient communication and reliability, making it a preferred choice for engineers and sourcing specialists. For more details, visit IC Manufacturer.

DS28E07P+T Key Features

Integrated secure EEPROM memory allows for data storage while protecting sensitive information, crucial for devices requiring authentication.

Low power consumption ensures longer battery life in portable applications, making it suitable for energy-sensitive designs.

1-Wire? interface simplifies connectivity and reduces the number of required connections, facilitating easier integration into existing systems.

Enhanced data integrity features prevent unauthorized access, ensuring that stored information remains secure and reliable.

DS28E07P+T Technical Specifications

Parameter | Value
Memory Size | 1 Kbit
Interface Type | 1-Wire
Operating Voltage | 1.8V to 5.25V
Temperature Range | -40??C to +85??C
Memory Type | EEPROM
Package Type | TO-92
Data Retention | 10 years
Write Endurance | 100,000 cycles

DS28E07P+T Advantages vs Typical Alternatives

Compared to typical alternatives, this device offers superior security and data integrity, making it more reliable for applications that demand high sensitivity and accuracy. Its low power usage and easy integration into existing systems provide a distinct advantage, enabling engineers to streamline designs without sacrificing performance.

Typical Applications

Smart card applications where secure storage of personal data is essential, ensuring safe transactions and user confidentiality.

Embedded systems requiring secure bootloader storage to protect firmware against unauthorized modifications.

Industrial automation systems for maintaining secure access to configuration settings and operational data.

Consumer electronics that necessitate secure user authentication and data integrity for enhanced user experience.

DS28E07P+T Brand Info

The DS28E07P+T is produced by a leading manufacturer renowned for its commitment to innovation and quality in the semiconductor industry. This product reflects the brand’s dedication to delivering reliable, efficient, and secure memory solutions tailored to meet the evolving needs of technology in various sectors.

FAQ

What is the primary function of the DS28E07P+T?

The primary function of this device is to provide secure data storage and management through its integrated EEPROM, making it suitable for applications that require high-level data protection and integrity.

What are the main advantages of using the 1-Wire interface?

The 1-Wire interface simplifies connectivity, requiring fewer pins and reducing circuit complexity, which is particularly beneficial for space-constrained designs and cost-sensitive applications.

Can the DS28E07P+T be used in outdoor applications?

Yes, the device operates within a wide temperature range of -40??C to +85??C, making it suitable for various outdoor applications where environmental conditions can vary significantly.

How long can data be retained in the DS28E07P+T?

The device ensures data retention for up to 10 years, providing confidence in long-term storage and reliability in critical applications.

What is the expected write endurance for this device?

The DS28E07P+T supports write endurance of up to 100,000 cycles, ensuring durability and reliability for frequent data updates in dynamic applications.